T(K)

P(bar)

See intructions in Matlab console window

0.2

0.40.6

1

0.8

1.2

1.6

2.2

2.6

2.8

3

3.4

3.8

4.4

5.4

5.6

5.6

750 800 850 900 950 1000 1050 1100 1150 1200 1250

2

3

4

5

6

7

8 x 10^4

0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 5.5