T(K)

P(bar)

See intructions in Matlab console window

4.625 4.6

4.54.475 4.45

4.425

4.4

4.35

4.375

4.175

680 700 720 740 760 780 800 820 840 860

2

3

4

5

6

7 x 10^4

4.1 4.15 4.2 4.25 4.3 4.35 4.4 4.45 4.5 4.55 4.6